-- Make spreader_brand nullable to support equipment-based spreader settings
-- When equipment_id is used, spreader_brand can be null

ALTER TABLE product_spreader_settings 
ALTER COLUMN spreader_brand DROP NOT NULL;

SELECT 'Made spreader_brand nullable for equipment-based settings!' as migration_status;